<template>
  <Img
    size="max-w-lg"
    alt="My gallery"
    alignment="mx-auto"
    img-class="rounded-lg transition-all duration-300 cursor-pointer filter grayscale hover:grayscale-0"
    src="https://flowbite-svelte.com/images/examples/content-gallery-3.png"
  />
</template>

<script setup>
import Img from '../../../../src/components/Typography/Img.vue'
</script>
