<template>
  <Img alignment="mx-auto" size="max-w-md" src="https://flowbite-svelte.com/images/examples/image-1@2x.jpg" alt="flowbite-vue" />
</template>

<script setup>
import Img from '../../../../src/components/Typography/Img.vue'
</script>
